##base _pvBase
##bias 30
##public
PP_InitPortPrint()()
PP_StopPortPrint(replyPort)(A0)
PP_ExecCommand(replyPort,data,command,datasize)(A0,A1,A2,D0)
PP_DumpRegs(replyPort)(A0)
PP_Print(replyPort,Text)(A0,A1)
PP_PrintNum(replyPort,Number)(A0,D0)
##end
