DEFINITION MODULE MyStart;

FROM DOSFiles       IMPORT  FileHandle;

VAR
  InitialInput,
  InitialOutput : FileHandle;


(*
    This module has DOSBase open and close in the two procedures.
    If you use one, use the other! and don't worry about DOSBase
*)

PROCEDURE EnteredFromWorkbench():BOOLEAN;
(*
   Sets up for either CLI or WB  RETURNS TRUE IF WB
   Sets variables above to a valid window to use
    and sets up console handler info if from WB
*)


PROCEDURE CleanUpAndExit;
(*
   Cleans up after the above
   ALSO CLOSES DOSBASE and window if opened above.
   SHOULD BE LAST CALL IN A PROGRAM
*)



END MyStart.


