[CGI_GDI]
~Default Mode=Standard Metafile
~Mode=Standard Options (Placeable Metafile)
~Header=WMF Output Filter Setup

Standard Options (Placeable Metafile)=GDI_WMF.2
Standard Metafile=GDI_WMF.1
Hidden Line Hidden Surface Removal=GDI_WMF.5


[Standard Options (Placeable Metafile)]
DefaultFileSpec=\ota\new_data\*.wmf
Driver=GDI_WMF.2
ColorTableSource=FILE
Text Mode=115
Line Mode=119
Fill Mode=122
Background Rect=1
Color Mode=103

[Standard Metafile]
DefaultFileSpec=\ota\new_data\*.wmf
Driver=GDI_WMF.1
ColorTableSource=FILE
Text Mode=115
Line Mode=119
Fill Mode=122
Background Rect=1
Color Mode=103

[Hidden Line Hidden Surface Removal]
DefaultFileSpec=\ota\new_data\*.wmf
Driver=GDI_WMF.5
ColorTableSource=FILE
Text Mode=116
Line Mode=120
Fill Mode=123
Background Rect=0
Color Mode=103


