"FIELD RESET HELP"

"The reset function will replace the original entry,  if any,  into the"
"high-lighted field.   If the reset  fails  to  produce results  it  is"
"telling you that there was no data recorded in the segment."

"If the MERGE function has been used to load another  record  the RESET"
"function will move data from the merged record onto the screen."
