APPLICATIONS MAKER - INSERT and DELETE LINE HELP

The  insertion/deletion of a line on the INPUT or REPORT  screens  is
not quite as simple as it might seem.  Also to be considered are  the
beginning and ending sub-screen in which to insert the line from  the
INPUT screen, and the beginning and ending column in which to  insert
the line from the REPORT screen.

The  insert/delete line functions act upon a rectangular  section  of
either  screen,  or the entire screen.  The INPUT screen  is  divided
into 78 column sub-screens.  The width of the input sub-screens is  a
known factor, and built into the program.

When  dealing with the REPORT, however, you may set the width.   This
allows  you to use wide-carriage printers, and to use  any  alternate
pitches  that  your printer might support.  You might choose  to  use
fifteen characters per inch, and have eight inch wide paper; yielding
one hundred twenty characters of report width.

Most  applications use multiple sub-screens on the INPUT screen,  and
it  is  quite possible that you are using multiple reports  as  well.
So, before you insert/delete a line, be sure that you know the limits
of  your  desired  process.   The  INPUT  will  prompt  you  for  the
first/last  SUB-SCREEN,  and the REPORT will ask for  the  first/last
COLUMN in which to insert/delete the line.

RANGE VIOLATIONS:

If  you are inserting/deleting an item from the first screen and  you
have  initialized an item that spans the first and second screens the
insert  process will be aborted and the line/column of the  offending
item will be displayed in an error message.

BLANK INPUT ITEMS:

When  inserting/deleting lines on the INPUT screen the  program  will
automatically  update the BLANK INPUT items that act upon the  chosen
portion  of  the screen.  If you insert a line these  items  will  be
changed  to  blank a portion of the screen one line down  from  their
original value; deleting a line will do the same one line up.

If  there  are  BLANK INPUT items that act upon the  first  two  SUB-
SCREENS, and you attempt to insert a line into only the first  screen
the insert will be aborted and the line/column of the offending  item
will be displayed in an error message.