 structure is rotated.  Again, the hard copy is scaled the same 
way and what you see is essentially what you get. 

(3) FIXED INCHES/ANGSTROM

This suboption allows you to set the scale to a fixed number of inches per 
Angstrom for the dot-matrix and/or pen plot, or simply to reduce or enlarge 
the image from the automatic-scale modes. When you enter this suboption, the 
original and current scale factors for dot-matrix and pen plot, in 
inches/Angstrom are printed out: then you can enter new factors. 

You must "key" the screen to either the dot-matrix image or the pen-plotter 
image. If you key the screen to the dot-matrix image, for example, this means 
that an object which just fits within the boundaries of the dot-matrix plot 
will do the same on the screen, but not necessarily the pen plot.  

You can display the hard-copy boundaries on