BEGIN DDIF

------------------------------------------------------------------------
-- DEVICE INFORMATION FILE  for Compaq Plasma display                 --
--                                                                    --
------------------------------------------------------------------------

--      + --- XHair flag
--      |  
--      V  
101     1  

--    +-----+-- X,Y Screen pixels per inch
--    V     V
301 77.00 77.00                         -- Plasma 640x400
--301 77.00 38.50                         -- CGA 640x200

--   GRAPHICS DRIVER CONFIG FLAGS.
--  *** DO NOT CHANGE THIS LINE ***
--  0 in a line number field means not used.
--    +-------------------------------- 0 = low res   ,  1 = high res.
--    |    +--------------------------- Color lookup table line number
--    |    |    +---------------------- Start shade color table line number
--    |    |    |    +----------------- Dark shade color table line number
--    |    |    |    |    +------------ Light shade color table line number
--    |    |    |    |    |    +------- Number of dsplist 16k's line number
--    |    |    |    |    |    |    +-- Dsplist o/f file name line number
--    |    |    |    |    |    |    |
120   0    0    0    0    0    0    0

END DDIF
END
