BEGIN DDIF
------------------------------------------------------------------------
-- DEVICE INFORMATION FILE  for NONE Dummy Plotter Driver             --
--                                                                    --
--                                                                    --
------------------------------------------------------------------------
--
------------------------------------------------------------------------
-- ******** Attention all programmers: you must document any ******** --
-- ******** and all changes you make to this file at the top! ******* --
------------------------------------------------------------------------

-- NONE Plotter Driver -------------------------------------------------

--This NONE driver needs no information from the DDIF

100 0   --(just so the .DIF file will have something in it)

END DDIF
END
                                                                       
