PAPER allows you to set the size of the plotter paper you
want to use.

Set the size of the paper by choosing from the following
options:

AMERICAN - to set your paper size in American 
           measurements.

The following are paper size options for American
measurements:

A (8.5 x 11 in.)
B (11 x 17 in.)
C (17 x 22 in.)
D (22 x 34 in.)
E (34 x 44 in.)


METRIC - to set your paper size using metric measurements.

The following are paper size options for metric
measurements:

A4 (210 x 297 mm or 8.27 x 11.69 in.
A3 (297 x 420 mm or 11.69 x 16.54 in.)
A2 (420 x 594 mm or 16.54 x 23.39 in.)
A1 (594 x 841 mm or 23.39 x 33.11)
A0 (841 x 1189 mm or 33.11 x 46.81 in.)


USER - to set your own personal paper size in inches by
       entering x and y values.

You are returned to the SETUP menu.
