SETUP allows you to configure all plotting parameters 
while in the CADKEY program.

Indicate the parameter you want to change by choosing from
the following options:

PAPER - to set the size of the plotter paper you want to 
use in American measurements, metric measurements, or your
own personal paper size in inches by entering x and y
values.

OFFSETS - to set x and y offset values to compensate if
your plotter adds a small offset value of its own. If
automatic centering is not used, these offset values are
calculated from the lower left corner of the plotter.

ROTATION - to set a plot rotation angle in degrees. This
value determines how CADKEY plots your drawing in respect
to its position in the plot file.

PLT PORT (Output Plot Port) - to set the destination of 
your file when plotting. The output port can be a serial
port, a parallel port, or filename.

PENS - to set the pen width, pen speed, and pen sorting.

PLOTTER - to indicate the language to transcribe your file
into according to the type of plotter you have.

CURV TOL - to assign a factor equal to or greater than 1.0
for curve tolerance. A lower factor creates smoother 
curves, but takes longer to plot. This value, in device
units, matches the length of the lines that the plotter 
uses when plotting the given curve.

CLIP LIM - to match the soft clip limits for your plotter.
The soft clip limits define the maximum plotting area. 
Check your plotter manual for more information on clipping
limits.

DONE - to indicate that you have set all of the plotter
parameters. You are returned to the PLOT menu where you 
can choose the PLOT option to send the assigned entities 
to the indicated plotting device.
