KEY IN allows you to enter a plotting scale value,
rotation angle, and x, y offset values.

Remember that only the entities displayed on the screen
are plotted. The default values for this option (e.g.,
plotter type, baud rate, etc.) are those assigned to the
CONFIG program.

Enter a scale value for plotting and press <Enter>. The
default scale factor found in parentheses is calculated
from the plot paper size specified in the CONFIG program
and the current part scale (or number of units in the
drawing window).

Enter a rotation angle (in degrees) and press <Enter>.

Enter x and y offset values for placing the part on the
paper. The x and y offset values are those assigned in the
CONFIG program. The 0,0 offset values automatically centers
the plot on the plotting paper.

Indicate a plotting method by choosing from the following
options:

PEN # - to plot according to the pen number attribute
assigned to each entity during part creation. The pen
number attribute in the system has a maximum value of 8.

COLOR - to plot according to the color assigned to each
entity during part creation. Because the color attribute in
the system ranges from 1 to 15, it is possible to control
up to 15 pens on the plotter.

Select the entities for plotting using the Selection Menu.

Press <Enter> to begin plotting.

To terminate plotting at any time press the <ESC> key.
Actual plotting terminates as soon as the plotter's buffer
is empty, which varies from plotter to plotter.
