SETUP allows you to configure all printing parameters from
inside the CADKEY program.

Indicate the parameter you want to change by choosing from
the following options:

PAPER - to indicate the minimum and maximum x and y 
dimensions of the paper in inches.

PORT - to indicate the port from which to print or the
device name or filename that you want to print to.

PRINTER  - to indicate the printer you want to use.

RESOLUT - to indicate the resolution of your printer.

DONE  - to indicate that you have finished setting up your
printer.
