CONIC allows you to calculate and display detailed
information about a selected conic. Verifiable conic types
include the ellipse, parabola, and hyperbola.

Although one branch of a hyperbola is displayed on the
screen when it is created, the CONIC option supplies
information about both branches.

Select the conic for which you want verification data to 
be displayed.

Verification data is displayed on the Prompt Line. Press
<Enter> to display each line of new information.

Redraw after all verification data has been displayed to
clear the screen of the temporary lines and markers used 
in displaying the data.
