CIRCLE allows you to select an arc or circle for
calculation.

A reference axis is established by choosing a location 
using a Position Menu option. The polar reference axis is
defined as a vector pointing out of the screen and passing
through the projection of the selected point to the 
current view. The selected segment's polar moment of 
inertia is then displayed.

You can Press <Enter> to indicate a new reference axis.
