GENERAL allows you to select a continuous string of
entities (excluding points) for perimeter calculation.

Choose a Selection Menu option and specify the desired
entities for calculation.

The perimeter is automatically calculated and displayed. 
If spline entities are selected, its true 3-D length and 
the length of its projection to the current view is 
displayed.

You can Press <Enter> to continue to select desired
entities.
