PERIM allows you to calculate the actual and projected
length of the perimeter of a single or selected group of
entities.

Indicate the shape available for perimeter analysis by
choosing from the following options:

CIRCLE - to select an arc or circle for a perimeter
calculations.

GENERAL - to select a continuous string (excluding points)
for perimeter calculation.
