POS+ENT allows you to calculate the minimum distance
between a position and a selected geometric entity.

Indicate a position on the screen as your first point of
measurement by selecting a Position Menu. Select an 
entity.

To display the next line of information, press <Enter>.

Redraw to clear the screen of the temporary lines used in
each of the calculations.
