CONTROL allows you to alter various modal parameters and
display detailed information about selected entities. It
also allows you to print and plot and to access DOS from
within the program.

Choose one of the following options:

VERIFY - to get information about the status of your part.

ATTRIB - to customize various attributes to your
         specifications. 

CONST  - to set certain construction parameters using
         various construction options.

COORDS - to set either view or world  coordinates.

STATUS - to display the amount of memory in bytes left for
         data storage.

PRINT  - to send the part currently displayed on the 
         screen to the printing device assigned in the 
         CONFIG program.

PLOT   - to send the part currently displayed on the 
         screen to the plotting device assigned in the 
         CONFIG program.

SYSCMD - to allow external programs or system processes to
         be run from inside the system, thus temporarily 
         suspending it.

