VIEW allows you to manipulate the view point of your
model.

When more than one viewport is displayed, you are prompted
to select the viewport you want to work in. It is in this
viewport that display views are reassigned or created.

The following eight view are predefined in the system:

View 1 - top
View 2 - front
View 3 - back
View 4 - bottom
View 5 - right
View 6 - left
View 7 - isometric
View 8 - axonometric

As you define and store more views, they are added to the
system's list and given the next available number in the
database for that part.

Note that the VIEW= function found in the Status Window
displays the current working view.

When entering the VIEW option, you are prompted to enter a
view number or to choose from the displayed menu to create
or save a new view.

The following are a few rules to keep in mind when using
the VIEW option:

* Views are NOT automatically stored in the system when
  created.

* You must SAVE a desired view unless a planar entity is
  selected to define the new view.

* Autoscale the part to center the new view of the part in
  the viewport.

* You can only recall saved views.

Manipulate the view, by choosing from the following
options:

VPORT  - to assign a new view to a viewport, by indicating
         a reference viewport. This option only works if
         you are working in multiple viewports.

ENTITY - to select an existing planar entity to define a
         view. Such entities include arcs, conics, or 2-D 
         splines.

NEW    - to create a new display view. Use the SAVE option 
         if you want to store this new view.

SAVE   - to store an unlimited number of new views (i.e., 
         a view that is not one of the system's predefined 
         views). The view is assigned the next sequential 
         view number. The prompt indicates the number of 
         views currently stored in your database and 
         allows you to enter a description for the new 
         view.

RENAME - to change the description of new views (i.e., a 
         view that is not one of the system's predefined
         views).
