SCALE allows you to increase or decrease the displayed
size of a part by entering a relative scale factor and a
new center position. You can set the current scale by
using the assigned Immediate Mode command or by choosing
the S: function in the Status Window.

This option does not change the part data, only the 
display of the part on the screen. To change the actual 
size of the part, use the X-FORM, SCALE options.

If you are working in more than one viewport, cursor-
indicate the viewport that contains the part you want to
scale. Note that you need to select the viewports one at a
time. In other words, you cannot scale all of the viewport 
simultaneously.

Enter a new scale factor to shrink or enlarge the selected
entities, relative to the currently displayed size of the
part. The current scale factor for the part is displayed 
in parentheses in the Prompt Line.

A scale factor f > 1 enlarges the part and the scale 
factor 0 < f < 1 shrinks the part.

Indicate a new center position for the part, or accept the
current center position by pressing <Enter>.

The part is scaled relative to its current size, using the
new center position and the assigned scale factor.
