DISPLAY allows you to manipulate existing entities and
drawings without permanently altering their coordinates.
These functions do not change the part's database, it only
changes the display of the part on the screen. To change
the actual size of the part, use the X-FORM, SCALE 
options.

These functions are very useful for visually referencing
different sections or views of a part, and for controlling
the appearance of the part itself.

Manipulate the display of your part by choosing from the
following options:

REDRAW - to clean-up (or rebuild) the display by
eliminating all broken lines and temporary reference
markers that result from creating and editing entities.

PAN - to redefine the center of a selected viewport,
relative to the part.

ZOOM - to temporarily alter the size of your part for
easier manipulation.

VIEW - to manipulate the display view of your model.

VWPORT (viewport) - to set and manipulate the number of
viewports on the display and to simultaneously display 
more than one view of your part.

LEVELS - to separate a part into different layers or
overlays. Each layer can be manipulated individually or
with other layers.

GRD/SNAP (Grid/Snap) - to set the grid spacing and snap
alignment within a viewport for use as a drawing aid.

AXES - to change the visual display of the current
construction and display view by turning the x, y, z
direction icon on and off.

CURSOR - to use the cursor as a visual guide for 
digitizing an existing drawing on your tablet, or for 
tracking the world coordinate location within the 
viewport.

Most of these functions can also be accessed in your 
Status Window Area or with an Immediate Mode command.
