CDE (CADKEY Dynamic Extension) is a mechanism that let the
programmers and developers add functionality to existing
programs without rebuilding the entire application. The 
CDE mechanism works with applications written in many 
languages, within network environments, and across system 
platforms. To Run CDE program, choose one of the following
options:

OPEN - to open a CDE library 

Enter a valid filename and press <Enter>. 

LIST/OPN (list/open) - to list, select, and open a
CDE library files from a designated directory.

Enter the pathname for the CDE file directory, and
press <Enter>. The default path in parentheses is the
CDE file directory assigned in the CONFIG program. To
accept the default directory, press <Enter>.

A listing of all CDE filenames in the designated
directory is displayed on the screen. 

CLOSE - to close (unload) a CDE library 

Enter a valid filename and press <Enter>. 


LIST/CLS (list/close) - to list, select, and close a
CDE library files.

A listing of all CDE filenames installed so far

Choose the desired filename. The File will be closed.


EXECUTE - to execute a CDE function.

Enter a valid function name and press <Enter>. 


LIST/EXE (list/execute) - to list, select, and execute
a CDE function from CDE library loaded.

A listing of all CDE function name in the def file for 
the CDE library are loaded in alphabetical order.



