TXT-OUT allows you to output a macro from the open library
to an ASCII text file.

Enter the name of an existing macro and press <Enter>.

Enter a filename for the new text file and press <Enter>.
The extension .txt is automatically added to the filename.
The text file is stored in the default macro directory, 
and you are returned to the LIBRARY menu.

After exiting CADKEY, you can edit the text file with a
standard ASCII text editor. The edited text file can be
read into CADKEY with the TXT-IN option.
