RENAME allows you to change the name of an existing macro
in the open macro library.

Enter the name of the existing macro and press <Enter>.

Enter the new name for the macro and press <Enter>.

If there is already a macro with the name that you have
entered, you are prompted to choose one of the following
options:

REPLACE - to delete the old macro and replaces it with the
new one.

REN-NEW - to enter a different name for the new macro.

REN-OLD - to enter a new name for the old macro.

OMIT - to exit without renaming either macro.

To create a binding file with this change, choose the SAVE
option.
