LOAD allows you to open an existing macro library, or to
create a new library. To execute a macro in CADKEY, the
appropriate macro library must be open.

Enter a library name and press <Enter>. If the specified
library does not exist, you are prompted to indicate
whether or not you want to create a new library.
