LIBRARY allows you to create, retrieve, and modify a macro
library that is used for storing a group of macros.

Manage macro libraries by choosing from the following
options:

LOAD - to open an existing macro library or create a new
library. To execute a macro in CADKEY, the appropriate
macro library must be open.

APPEND - to add the contents of a specified macro library
to the open library.

DELETE - to remove a macro from the open macro library.

LST/EXE - to display a listing of macros in the open
library and allow you to choose a macro for execution.

RENAME - to change the name of an existing macro in the
open macro library.

TXT-OUT - to output a macro from the open library to an
ASCII text file. This option is useful for editing 
existing macros.

TXT-IN - to read in an ASCII text file and convert it to a
macro. This option is usually used after the TXT-OUT 
option to edit an ASCII version of a macro.
