SAVE allows you to store the current part, in the 
selected view, as a plot file.

Enter a filename for the plot file, and press <Enter>. 
When CADKEY displays more than one viewport, select 
the viewport containing the view you want to store as
a plot file.

To store the plot file, choose one of the following
options:

PEN # - to plot according to the pen number attribute
assigned to each entity during part creation. Because the 
pen number attribute in the system has a maximum value of
eight, use plotter pens nine and above with plotters that
support more than eight pens.

COLOR - to plot according to the color assigned to each 
entity during part creation. The color attribute in the 
system ranges from 1 to 15, allowing you to control up
to 15 pens on the plotter.

Select the entities to be stored in the plot file using a
Selection Menu option.

CADKEY creates the plot file automatically.
