LOAD allows you to retrieve a previously saved part file.

Before a part is retrieved and displayed, indicate whether
or not to save or replace the current part by choosing an 
option from the NO/YES menu.

Load a part, by entering the desired filename, and 
pressing <Enter>. If the file is not stored in the default
PART directory (as defined with the CONFIG program), you 
must include the correct pathname when you enter the 
filename.
