STANDRD allows you to enable or disable the display of
leading and/or trailing zeros; position parallel dimension
text horizontally, or aligned with the dimensions leader
lines, (this standard varies for ANSI or ISO); toggle 
between automatic and manual creation of dimension text;
create shortened radii/diameter leaders; and set note text
line spacing.

Indicate the standard by choosing from the following
options:

ZEROS    - to enable or disable the display of zeros in
           dimensions.

DIM ALN  - to display a parallel dimension horizontally,
           or aligned with the dimensions leaders.

DIM MOD  - to switch between automatic and manual creation
           of dimension text. Automatic dimensioning, the
           default option, is always in effect when you 
           start up the program.

SHRT RD  - to create radius or diameter dimensions with
           shortened solid leader lines.

LIN SPAC - to set the amount of space between successive
           lines of text in a note or file-based note that
           is to be drawn, or painted, or plotted.
