ANGULAR affects only the angular dimensions for 
tolerancing.

Indicate how to display the dimensions by choosing form 
the following options:

NONE  - to turn off tolerancing.
     
+/-   - to display dimensions followed by a plus-minus
        tolerance representation.

LIMIT - to display dimensions with the high limit (maximum
        value) above the low limit (minimum value).

All tolerancing from this point on is displayed with the
assigned values. Use the CHANGE and/or UPDATE functions 
to alter existing tolerances.
