TOLER (tolerancing) allows you to specify the tolerancing
to be automatically applied to a dimension. Tolerancing is
set separately for angular and linear dimensions.

Indicate the type of dimension by choosing from the 
following options:

ANGULAR - to assign angular dimensions for tolerancing.

LINEAR  - to assign linear dimensions (such as horizontal,
          vertical, parallel, radial, and diametrical) for
          tolerancing.
