DIM FNT (Dimension Font) allows you to specify the font
type to be used for all dimensioning text. To achieve
faster redraw speed, the box font is recommended.

The DF: parameter in the Status Window can also be used to
alter this setting.

Choose the dimension text style.

Enter a slant angle and indicate whether you want the font
to be filled.

When the drawing is completed, you can use the CHANGE
function to assign the bold fonts if desired.

All text in dimensions created from this point on take on
the newly assigned font.

There are two standard fonts, BOX and BOLD. However, you
can create and use your own display fonts.
