DECIMAL allows you to set the number of digits to the 
right of the decimal point in an existing dimension.

Indicate the desired decimal precision by choosing one of
the formats shown in the current menu (n represents any
digit from 0 to 9).

All dimensions created from this point on are assigned the
new decimal value.
