DIM SCL (dimension scale) allows you to change a dimension
value by applying a scale factor. Tolerance values,
angular dimensions, and manually-entered dimensions are
not considered for this option. The factor chosen is
applied to the original dimension value, ignoring any
scaling that may have been previously applied to the
dimension.

Enter a value for a new dimension scale factor and press
<Enter>.

Select the dimensions you want to change using a Selection
Menu option.

Selected dimension values are redrawn and displayed with
the scale factor applied.
