TYPE allows you to change the type of tolerancing used in
a selected dimension.

Indicate the tolerance type by choosing from the following
options:

NONE  - to turn off tolerancing.

+/-   - to display dimensions followed by a plus-minus
        tolerance representation.

LIMIT - to display dimensions with the maximum value
        displayed over the minimum value.
