WITNESS allows you to change the witness line display on 
an existing dimension entity.

Select the desired dimension(s) for change.

Indicate the witness line display by choosing from the
following option.

Choose a method from the menu displayed:

BOTH   - to display both witness lines of the dimension.

FIRST  - to display only the first of two witness lines in
         the order that they were stored in the database.

SECOND - to display only the second of two witness lines
         in the order that they were stored in the 
         database.

NONE   - to display no witness lines of the dimension.

The current status of the witness lines in the dimension 
is initially displayed on the Prompt Line to avoid
confusion about whether the FIRST or SECOND witness line
is currently displayed.

The dimension is redisplayed with the option assigned.
If the wrong witness line is displayed, reselect from 
the menu and repeat the process.
