DEG MIN allows you to set an angular dimension's text 
representation to degrees minutes, and seconds.

Choose a Selection Menu option.

Indicate which dimension representation(s) you want to 
change.

The dimension text representation of the indicated
dimensions is changed to degrees, minutes, and seconds.
