DECIMAL allows you to change the number of digits to the
right of the decimal point in an existing dimension.

Choose the decimal precision option in the Menu Options
Window.

Choose from the Selection Menu and select the dimensions 
for change.

The dimension or dimensions are redrawn with the new 
decimal value assigned.
