LIN SPAC allows you to change the amount of space between
successive lines of text in a note or file-based note 
that is to be drawn, printed, or plotted.

Enter a line spacing factor, which must be a positive 
number. This factor is the ratio between the current text
height and the line spacing. For example, if your text
height is one inch, and your factor is 0.05, the line
spacing between lines of text is one-half inch.

You can continue using the TXT ATT menu to choose other
attributes to change. If this is the last, or only
attribute that you want to change, choose DONE from the 
TXT ATT menu.

When you choose the DONE option, the Selection Menu
appears. Choose a method of selection and if prompted,
indicate the viewport that contains the text that you want
to change.
