LEVEL lets you turn levels on and off in any of a layout's
drawing instances. 

The levels that CADKEY displays in each drawing instance
that you place in a layout are identical to those that
were active in the original part file in Model Mode when
you switched to Drawing Layout Mode.

When CADKEY prompts you, select an instance. CADKEY
surrounds the active instance with a dashed highlighted
box.

A window appears; select the levels that you want to add
or delete from the active instance by positioning the 
light bar over the level number and clicking.

When you finish setting the level mask, press <Enter>.
CADKEY redraws the instance to reflect the changes.
Remember, the level changes only occur in the active
instance.

Press (Esc) to return to CADKEY's Main Menu or (F10) to
return to the MODIFY menu.
	
