VIEW changes an instance's display view by letting you
choose a new view from a pop-up window.

Cursor select the instance you want to change. CADKEY
surrounds the active instance with a dashed highlighted 
box.

Choose a new view for the instance from the pop-up window.
You can choose any of CADKEY's eight standard views, a
system view, or a user-defined view.

CADKEY changes the drawing instance's display view. Press
(F10) to return to the MODIFY menu.

In Drawing Layout Mode, if you change the view of an 
instance that you've dimensioned or cross-hatched using
INSTANCE, MODIFY, VIEW; CADKEY deletes the dimension or
cross-hatching. 
