ROTATE changes an instance's rotation angle by letting you
to enter a new value.

The active instance is surrounded by a dashed,
highlighted box.

Enter the new rotation angle, or press <Enter> to accept
the default.

Enter a positive angle value in degrees. CADKEY changes
the rotation angle by doing a 2-D rotation about the
drawing instance's center. 

Remember, you are changing the active instance's rotation
angle, not that of any of the other instances.

In Drawing Layout Mode, when you rotate an instance that
has a cross-hatching or dimensions tagged to it, the 
cross-hatching pattern or dimension moves accordingly.

Press (F10) to return to the MODIFY menu.
