SCALE lets you change the drawing scale of individual
drawing instances in a layout by entering a new scale 
value.

The active instance is surrounded by a dashed,
highlighted box.

Enter the new scale value, or press <Enter> to accept the
default. 

CADKEY changes the drawing scale. Remember, you are 
changing the active instance's scale, not the scale of any
of the other instances.

To modify the drawing scale of all of the instances, use
DETAIL, LAYOUT, MODIFY.

Press (F10) to return to the MODIFY menu.
