LABEL creates tags with leaders and arrows for your
drawing. You can create up to five arrowhead positions for
each label. Use UNDO, (Alt)-(I), to remove the last label
you created before you start a new one.

If you create a label in Model Mode, and then enter 
Drawing Layout Mode, the label will not appear. Do
detailing in Drawing Layout Mode.

Type the number of arrowheads for the label, or press 
<Enter> to accept the default. CADKEY's on-line text 
editor appears. 

Type the label text. Labels can be up to 80 characters
long. If you try to create a label over 80 characters,
CADKEY crops the text from the right.

You can use any of the following characters to create your
label:

        ! @ # $ % ^ & o () + - = {} [] ~'":;?/>.<,|\ 0-9,
        A-Z, a-z, ±,  , Æ, (Spacebar),and <Enter>

Choose SAVE TX to save the text or press <Enter> twice.

Choose an option from the Position Menu to indicate where
you want to place the text. The text appears on-screen.
CADKEY positions the text according to the note placement
alignment set in DETAIL, SET, TEXT, NOT PLC.
 
Cursor indicate a position for the label's leader on the
left or right side of the text.

Once you define a side, a rubberband line appears.

Choose an option from the Position Menu to indicate the
arrowhead position. An arrow appears in the direction you
specified.

Repeat this step depending on the number of arrowheads set
in Step 1.

The current note height setting determines the length of
the first leader line and arrowhead size. CADKEY uses the 
current level and color number settings when it creates 
the label.
