VERTICL allows you to present the vertical dimensions
between two specified points/positions.

Indicate the two points for dimensioning using a Position
Menu option. Each point indicated represents placement of
the witness lines in the dimension.

Indicate dimension text placement position using the
cursor, or by typing in the x, y view coordinates. Text is
positioned according to the dimension placement alignment
specified in the SET, TEXT function.

With the DIM MOD switch set to AUTOMAT, the dimension is
calculated automatically.

With the DIM MOD switch set to MANUAL, the on-line text
editor is activated and you are prompted to enter the
dimension text.

To conclude the text input, choose the SAVE TX (save text)
option.

Dimensioning is done when all three positions are
designated. Witness lines, leaders, text, and arrows are
drawn according to the current modal settings in effect.
The dimension is assigned the current color in effect and 
is created on the current active level.

When the VER DIM (verify dimension) switch is ON, you are
prompted to accept or reject the dimension placement.
Choose from the NO/YES menu displayed.
