2 CURVE allows you to create a spline mesh that is defined
by a selected generator and director curve. The mesh
approximates the swept surface that is formed by moving
(sweeping) the generator curve along the director curve.

Define the sweep of the profile by choosing from the
following options:


TRANSL (translate) - to maintain the generator curve's
orientation relative to the world coordinate frame as the
generator curve is moved along the director curve.

ROTATE - to maintain the generator curve's orientation to
the director curve as the generator curve is moved along 
the director curve.


Select the line, arc, conic, or spline to be used as the
generator curve.

Enter the number of segments that the generator curve is
to be broken into.

Select the line, arc, conic, or spline to be used as the
director curve, near the end from which you want to start
the sweep of the generator curve.

Enter the number of segments that the director curve is to
be broken into.

A temporary mesh is displayed, along with a NO/YES menu. 
If the curves are connected correctly, choose YES. If the
curves are not connected correctly, choose NO and select
another generator curve.

Indicate whether to group the entities. Choose NO to
continue without grouping. Choose YES to create a group,
and enter a group name.

The mesh is created.
