3D CLSD allows you to create a 3-D cubic parametric spline
(a true curve) that begins and ends at the first point
selected, appearing as an unbroken loop. The slope and
curvature are continuous at all points on the spline.

Indicate a series of nodes, using Position Menu options.

Press <Enter> when node positioning is complete, and the
closed spline is automatically created.
