WID/HT allows you to create a polyline rectangle by
specifying the width, height, and a position for the lower
left corner.

Enter a value for the width of the rectangle and press
<Enter>, or accept the default value in parentheses by
pressing <Enter>.

Enter a value for the height of the rectangle and press
<Enter>, or accept the default height displayed in
parentheses by pressing <Enter>.

Indicate a position for the lower left corner of the
rectangle, using a Position Menu option.

In 2-D construction mode, the reference point is projected
to the current construction plane, and the polygon is
created in the construction plane.

In 3-D construction mode, the polygon is created in the
plane that is parallel to the construction plane and 
passes through the indicated reference position.
