2 CURVE allows you to create a line mesh defined by a
selected generator curve and director curve. The mesh
approximates a swept surface that is formed by moving
(sweeping) the generator curve along the director curve.

Define the sweep of the profile by choosing from the
following options:

TRANSL   (translate) - to maintain the generator curve's
         orientation relative to the world coordinate 
         frame as the generator curve is moved along the
         director curve.

ROTATE - to maintain the generator curve's orientation 
         to the director curve as the generator curve is 
         moved along the director curve.


