PARALEL allows you to create a line parallel to an 
existing line.

The length of the new line is determined by the L-LIMIT
(line limits) switch setting. Line limits are set by
selecting the CONTROL, L-LIMIT options from the Main Menu.

Create a parallel line by choosing from the following
options:


THRU PT - to create a line parallel to a selected line,
          through a specified point.

AT DIST - to create a parallel line at a specified 
          distance from a selected reference line.
